300 350 400 450 500 0 0.1 0.2 0.3 0.4 0.5 0.6 Raw Data, CnNu

300 350 400 450 500 0 0.1 0.2 0.3 0.4 0.5 Reconstructed Data % Tot SS = 35.4973

300 350 400 450 500 0 0.1 0.2 0.3 0.4 Spec Dec Comp. 1 % Tot SS = 18.5554

0 20 40 60 0 0.5 1 1.5 2 2.5 Spec Dec Coeff. 1

300 350 400 450 500 0 0.1 0.2 0.3 0.4 0.5 0.6 Spec Dec Resid. 1 % Tot SS = 50.3682

300 350 400 450 500 0 0.1 0.2 0.3 0.4 0.5 Spec Dec Comp. 2 % Tot SS = 15.546

0 20 40 60 0 0.5 1 1.5 2 2.5 Spec Dec Coeff. 2

300 350 400 450 500 0 0.1 0.2 0.3 0.4

Spec Dec Resid. 2 % Tot SS = 21.0681