0 50 100 150 200 0 0.1 0.2 0.3 0.4 0.5 0.6 Raw Data, CnNu

0 50 100 150 200 0 0.1 0.2 0.3 0.4 0.5 0.6 Reconstructed Data

% Tot SS = 96.2595

0 50 100 150 200 0 0.1 0.2 0.3 0.4

Spec Dec Comp. 1

% Tot SS = 58.9413

0 20 40 60 0

0.5

1

1.5

Spec Dec Coeff. 1

0 50 100 150 200 0

0.05

0.1

0.15 Spec Dec Resid. 1

% Tot SS = 7.6955

0 50 100 150 200 0

0.05

0.1

0.15 Spec Dec Comp. 2

% Tot SS = 6.5826

0 20 40 60 0

0.2

0.4

0.6 Spec Dec Coeff. 2

0 50 100 150 200 0 0.01

0.02

0.03

0.04 Spec Dec Resid. 2

% Tot SS = 0.074404