0 50 100 150 200 0 0.2 0.4 0.6 0.8 Raw Data, ha59

0 50 100 150 200 0 0.2 0.4 0.6 0.8 Reconstructed Data

% Tot SS = 94.7217

0 50 100 150 200 0 0.1 0.2 0.3 0.4 0.5 0.6 Spec Dec Comp. 1

% Tot SS = 53.2052

0 20 40 60 0 0.5 1 1.5 2 Spec Dec Coeff. 1

0 50 100 150 200 0 0.05 0.1 0.15 0.2

Spec Dec Resid. 1

% Tot SS = 9.7889

0 50 100 150 200 0 0.05 0.1 0.15 0.2

Spec Dec Comp. 2

% Tot SS = 8.0423

0 20 40 60 0 0.2 0.4 0.6 0.8 Spec Dec Coeff. 2

0 50 100 150 200 0 0.01 0.02 0.03 0.04 0.05 0.06 Spec Dec Resid. 2

% Tot SS = 0.11155