0 20 40 0 0.05 0.1 0.15 0.2 Raw Data, ToySpect P2 D21

0 20 40 0 0.1 0.2 0.3 0.4 nmf U: Unit Vector 1

NMF repeated7 times

0 10 20 30 40 0 0.1 0.2 0.3 0.4 0.5 0.6 nmf V curve, for UV 1

0 20 40 0 0.1 0.2 0.3 0.4 nmf U: Unit Vector 2

0 10 20 30 40 0 0.1 0.2 0.3 0.4 0.5 0.6 nmf V curve, for UV 2

0 20 40 0 0.05 0.1 0.15 0.2 Reconstructed Data

avg %SS of Raw = 99.9738 min %SS of Raw = 99.8793 avg %R^2(MM) = 97.7247 min %R^2(MM) = 89.5075

0 20 40 0 0.1 0.2 0.3 0.4 0.5 nmf U: Unit Vector 3

0 10 20 30 40 0 0.1 0.2 0.3 0.4 nmf V curve, for UV 3