0 20 40 0 0.05 0.1 0.15 0.2 Raw Data, ToySpect P1 D1

0 20 40 0 0.05 0.1 0.15 0.2 Reconstruction, Comp. 1, 2 & 3 % of Tot. SS = 99.9995

0 20 40 0 0.02

0.04

0.06

0.08 0.1 0.12

NSVD Projections, for Comp. 1 % of Tot. SS = 44.6121

0 20 40 0 0.1 0.2 0.3 0.4 NN Coeff, for NSVD Comp. 1

0 20 40 0 0.05 0.1 0.15 0.2 NN Residuals, for Comp. 1 % of Tot. SS = 29.6365

0 20 40 0 0.05 0.1 0.15 0.2 NSVD Projections, for Comp. 2 % of Tot. SS = 22.6527

0 20 40 0 0.1 0.2 0.3 0.4 0.5 NN Coeff, for NS1R1 Comp. 2

0 20 40 0 0.02

0.04

0.06

0.08

NN Residuals, for Comp. 2 % of Tot. SS = 6.9838

0 20 40 0 0.02

0.04

0.06

0.08

NSVD Projections, for Comp. 3 % of Tot. SS = 6.9836

0 20 40 0 0.05 0.1 0.15 0.2

NN Coeff, for NS1R1 Comp. 3

0 20 40 0 1 2 3 x 10^{-6}

NN Residuals, for Comp. 3 % of Tot. SS = 4.1001e-009