0 20 40 0 0.05 0.1 0.15 0.2 Raw Data, ToySpect P2 D31

0 20 40 0 0.05 0.1 0.15 0.2 Reconstruction, Comp. 1, 2 & 3 % of Tot. SS = 98.7327

0 20 40 0 0.05 0.1 0.15 0.2 NSVD Projections, for Comp. 1 % of Tot. SS = 56.7249

0 20 40 0 0.2 0.4 0.6 0.8 NN Coeff, for NSVD Comp. 1

0 20 40 0 0.05 0.1 0.15 0.2 NN Residuals, for Comp. 1 % of Tot. SS = 19.3955

0 20 40 0 0.05 0.1 0.15 0.2 NSVD Projections, for Comp. 2 % of Tot. SS = 18.2784

0 20 40 0 0.2 0.4 0.6 0.8 NN Coeff, for NS1R1 Comp. 2

0 20 40 0 0.01

0.02

0.03

0.04

0.05

0.06

NN Residuals, for Comp. 2 % of Tot. SS = 0.82626

0 20 40 0 0.01

0.02

0.03

0.04

0.05

0.06

NSVD Projections, for Comp. 3 % of Tot. SS = 0.77785

0 20 40 0

0.05

0.1

0.15

NN Coeff, for NS1R1 Comp. 3

0 20 40 0 1 2 3 x 10^{-3}

NN Residuals, for Comp. 3 % of Tot. SS = 0.0064178