0 20 40 0 0.05 0.1 0.15 0.2 Raw Data, ToySpect P1 D1

0 20 40 0 0.05 0.1 0.15 0.2 Reconstructed Data

% Tot SS = 100

0 20 40 0 0.05 0.1 0.15 0.2 Spec Dec Comp. 1

% Tot SS = 72.5352

0 10 20 30 40 0 0.1 0.2 0.3 0.4 0.5 Spec Dec Coeff. 1

0 20 40 0 0.02 0.04 0.06 0.08 0.1 0.12 Spec Dec Resid. 1

% Tot SS = 27.4019

0 20 40 0 0.02 0.04 0.06 0.08 0.1 0.12 Spec Dec Comp. 2

% Tot SS = 27.4019

0 10 20 30 40 0 0.05 0.1 0.15 0.2 0.25 0.3 Spec Dec Coeff. 2

0 20 40 0 2 4 6 8 10 12 x 10_{-8} Spec Dec Resid. 2

% Tot SS = 1.4096e-012