0 20 40 0 0.05 0.1 0.15 0.2 Raw Data, ToySpect P2 D31

0 20 40 0 0.05 0.1 0.15 0.2 Reconstructed Data

% Tot SS = 98.5717

0 20 40 0 0.05 0.1 0.15 0.2 Spec Dec Comp. 1

% Tot SS = 74.953

0 10 20 30 40 0 0.2 0.4 0.6 0.8 Spec Dec Coeff. 1

0 20 40 0 0.02 0.04 0.06 0.08 0.1 Spec Dec Resid. 1

% Tot SS = 4.6265

0 20 40 0 0.02 0.04 0.06 0.08 0.1 Spec Dec Comp. 2

% Tot SS = 4.4051

0 10 20 30 40 0 0.05 0.1 0.15 0.2 0.25 Spec Dec Coeff. 2

0 20 40 0 0.005 0.01 0.015 0.02 Spec Dec Resid. 2

% Tot SS = 0.025721