Figure 1

Gene 1

Gene 2

PC1 Direction FLD Direction

-4 -2 0 2 4 0 0.1 0.2 0.3 0.4 Figure 2 A

-4 -2 0 2 4 0 5 10 15 20 25 30 Figure 2 B

Angle (deg) = 58.3

-4 -2 0 2 4 0 0.5 1 1.5 2 2.5 3 Figure 2 C

Angle (deg) = 35.8

-4 -2 0 2 4 0 0.2 0.4 0.6 Figure 2 D

Angle (deg) = 26.4