0 100 200 300 0

0.01

0.02

Affy cDNA

NCI60 Data

PC1 Direction

-20 0 20 40 0 0.005 0.01 0.015 0.02

PC2 Direction

-20 0 20 40 0

0.02

0.04

PC3 Direction

-20 0 20 40 0 0.01 0.02 0.03

PC4 Direction

-20 0 20 40 0 100 200 300 Affy o, cDNA +

PC2 Direction

PC1 Direction

-20 0 20 40 0 100 200 300 Raw Data

PC3 Direction -20 0 20 40 0 100 200 300 Raw data PCA Axes

PC4 Direction

-20 0 20 40 -20 0 20 40

PC3 Direction

PC2 Direction

-20 0 20 40 -20 0 20 40

PC4 Direction

-20 0 20 40 -20 0 20 40

PC4 Direction

PC3 Direction