-10 0 10 20 0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

Affy cDNA

NCI 60 (revised), DWD Adj. 2 Sample t-test

Combined, t-stat = 21.6831 cDNA only, t-stat = 14.5361

Affy only, t-stat = 16.7691

-10 0 10 20 0

0.01

0.02

0.03

0.04

0.05 cDNA

cDNA: RENAL, 2 Sample t-test

RENAL vs. rest, t-stat = 15.2532

-10 0 10 20 0 0.01 0.02 0.03 0.04 0.05 0.06 0.07

Affy

Affy: RENAL, 2 Sample t-test

RENAL vs. rest, t-stat = 19.6176

Labels of RENAL Highlighted Data

RENAL.UO31 RENAL.A498 RENAL.CAKI1 RENAL.RXF393 RENAL.7860 RENAL.ACHN RENAL.TK10 RENAL.SN12C

15 20 25 0 0.02 0.04 0.06 0.08 0.1 0.12 0.14 0.16 0.18

1000 Combo t-stats, from random relab’s t = 21.6831 pval = 0.016543

15 20 25 30 0 0.02 0.04 0.06 0.08 0.1 0.12

1000 Affy only t-stats, from random relab’s t = 19.6176 pval = 0.41074