-10 0 10 20 0 0.01

0.02

0.03

0.04

Platform 1, Type o

Platform 1, Type +

Platform 2, Type o

Platform 2, Type +

Toy Example 2

PC1 Direction

-20 -10 0 10 20 0 0.01

0.02

0.03

0.04

PC2 Direction

-20 -10 0 10 20 0 0.01

0.02

0.03

0.04

PC3 Direction

-20 -10 0 10 20

-10 0 10 20 Dependent N(+-0.2,1), d = 4000

PC2 Direction

PC1 Direction

-20 -10 0 10 20

-10 0 10 20 PCA Coordinates

PC3 Direction

-20 -10 0 10 20 -20 -10 0 10 20

PC3 Direction

PC2 Direction