0 0.2 0.4 0.6 0.8 1 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

μ

Avg. Error Rate (prop. in 100)

CRD DWD SVM

d = 10 d = 100 d = 1000

Class X Class Y Overall