0 0.2 0.4 0.6 0.8 1 0

0.2

0.4

0.6

0.8

1 m = 2 N(0,1), Class Error Rates

μ

Avg. Error Rate (prop. in 100)

MD DWD SVM

0 0.2 0.4 0.6 0.8 1 0

0.2

0.4

0.6

0.8

1 n = 1 N(mu,1), Class Error Rates

μ

MD DWD SVM

0 0.2 0.4 0.6 0.8 1 0

0.2

0.4

0.6

0.8

1 Combined (m,n prop’l) Error Rates, d = 10

μ

Avg. Error Rate (prop. in 200)

MD DWD SVM

0 0.2 0.4 0.6 0.8 1 0 10 20 30 40 50 60 70 80 90 Angle to Optimal, 1000 repl’ns

μ

Avg. Angle (deg.)