0.2 0.4 0.6 0.8 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 Unif. QQ forα = 0.9 Power Trans.

Uniform(0,1), Q

Data Q for Chi

2(7) Trans’d Dist.

0.2 0.4 0.6 0.8 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 Unif. QQ forα = 0.7 Power Trans.

Uniform(0,1), Q

0.2 0.4 0.6 0.8 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 Unif. QQ forα = 0.5 Power Trans.

Uniform(0,1), Q

0.2 0.4 0.6 0.8 0.3 0.4 0.5 0.6 0.7 0.8 Unif. QQ forα = 0.3 Power Trans.

Uniform(0,1), Q