0 1 2 3 4 5 6 7 8 -6

-4

-2

0

2

4

6 Standardized Para. Coord. View of Sphered Data

0 1 2 3 4 5 6 7 8 -6

-4

-2

0

2

4

6 St’zed Para. Coord. View of Rad. Transf. Data