50 100150200250 -20 -10 0 10 20 Raw Data

Scale Coupled

50 100150200250 -20 -10 0 10 20 Center: Mean 8.388e-028% of Tot

50 100150200250 -20 -10 0 10 20 Center Resid. 100% of Tot

0 5 10 0

0.5

1 PC R-squareds

PC #

R2

50 100150200250 -20 -10 0 10 20 PC1 Proj.

50 100150200250 -20 -10 0 10 20 Center +- PC1

59.07% of CR

50 100150200250 -20 -10 0 10 20 Resid, PC1

40.93% of above

-50 0 50 100 0 0.005

0.01

0.015

Scores kde, PC1

50 100150200250 -20 -10 0 10 20 PC2 Proj.

50 100150200250 -20 -10 0 10 20 Center +- PC2

11.51% of CR

50 100150200250 -20 -10 0 10 20 Resid, PC2

80.52% of above

-40 -20 0 20 0 0.01

0.02

0.03

Scores kde, PC2

50 100150200250 -20 -10 0 10 20 PC3 Proj.

50 100150200250 -20 -10 0 10 20 Center +- PC3

8.446% of CR

50 100150200250 -20 -10 0 10 20 Resid, PC3

26.6% of above

-20 -10 0 10 0 0.01

0.02

0.03

Scores kde, PC3

50 100150200250 -20 -10 0 10 20 PC4 Proj.

50 100150200250 -20 -10 0 10 20 Center +- PC4

3.661% of CR

50 100150200250 -20 -10 0 10 20 Resid, PC4

56.66% of above

-10 0 10 0 0.01 0.02 0.03 0.04

Scores kde, PC4