-5 0 5 0 0.05 0.1 0.15 0.2 Data Coordinate Directions

Data Coor. 1

-5 0 5 10 0 0.05 0.1 0.15 0.2 0.25

Data Coor. 2

-20 0 20 0 0.02

0.04

0.06

0.08 0.1 0.12

Data Coor. 3

-5 0 5 10 -6 -4 -2 0 2 4 4 Different Size and Very Close

Data Coor. 2

Data Coor. 1

-20 0 20 -6 -4 -2 0 2 4 Oriented in Axes Directions

Data Coor. 3

-5 0 5

-5 0 5 10

Data Coor. 1

Data Coor. 2

-20 0 20

-5 0 5 10

Data Coor. 3

-5 0 5 -30 -20 -10 0 10 20 30

Data Coor. 1

Data Coor. 3

-5 0 5 10 -30 -20 -10 0 10 20 30

Data Coor. 2