-0.3 -0.2 -0.1 0 0.1 0

2

4

6

8

10 Scal. Full, PC1 (raw)

Schizo, n = 40Normal, n = 31

-5 0 5 0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09

Scal. Full, PC1 (mad)

Schizo, n = 40Normal, n = 31

-1 0 1 0 0.1 0.2 0.3 0.4 0.5 0.6 Scal. Full, PC1 (sph)

Schizo, n = 40Normal, n = 31

-0.02 0 0.02 0 2 4 6 8 10 12 14 16 18 Scal. Full, PC1 (ell)

Schizo, n = 40Normal, n = 31

0 20 40 60 80 0

0.02

0.04

0.06

0.08

0.1 Stab., 100 B.S. Repl’s, 22-Oct-1999

dimensions away

0 20 40 60 80 0

0.005

0.01

0.015

0.02

Stab., 100 B.S. Repl’s, 22-Oct-1999

dimensions away

0 20 40 60 80 0

0.01

0.02

0.03

0.04

0.05

Stab., 100 B.S. Repl’s, 22-Oct-1999

dimensions away

0 20 40 60 80 0

0.01

0.02

0.03

0.04

0.05

0.06

Stab., 100 B.S. Repl’s, 22-Oct-1999

dimensions away