-20 -10 0 x 10^{-3} 0 20 40 60 80

Scal. Full, O.P. (raw)

Schizo, n = 40 Proj. ortho to Normal

R^2 Dir. = 0.0044356 R^2 S.S.. = 0.020404

-15 -10 -5 0 5 x 10^{-3} 0 20 40 60 80 100 120 Scal. Full, O.P. (raw)

Normal, n = 31 Proj. ortho to Schizo

R^2 Dir. = 0.0024523 R^2 S.S.. = 0.012401

-10 -5 0 0 0.05 0.1 0.15 0.2 0.25

Scal. Full, O.P. (mad)

Schizo, n = 40 Proj. ortho to Normal

R^2 Dir. = 0.049091 R^2 S.S.. = 0.22988

-2 0 2 0 0.05 0.1 0.15 0.2 0.25

Scal. Full, O.P. (mad)

Normal, n = 31 Proj. ortho to Schizo

R^2 Dir. = 0.02241 R^2 S.S.. = 0.1195

-0.3 -0.2 -0.1 0 0.1 0 1 2 3 4 5 6 Scal. Full, O.P. (sph)

Schizo, n = 40 Proj. ortho to Normal

R^2 Dir. = 0.006146 R^2 S.S.. = 0.033452

-0.1 0 0.1 0

2

4

6

Scal. Full, O.P. (sph)

Normal, n = 31 Proj. ortho to Schizo

R^2 Dir. = 0.0027787 R^2 S.S.. = 0.015972

-10 -5 0 5 x 10^{-4} 0 200 400 600 800 1000

Scal. Full, O.P. (ell)

Schizo, n = 40 Proj. ortho to Normal

R^2 Dir. = 0.00021571 R^2 S.S.. = 0.00074801

-6 -4 -2 0 2 4 x 10^{-4} 0 500 1000

1500

2000

2500

Scal. Full, O.P. (ell)

Normal, n = 31 Proj. ortho to Schizo

R^2 Dir. = 5.5347e-005 R^2 S.S.. = 0.0002057

0.016 0.018 0.02 0.022 0 50 100 150 200 250 300 S.S. R^2 for 100 relabels (raw)

0.15 0.16 0.17 0.18 0 10 20 30 40 S.S. R^2 for 100 relabels (mad)

0.024 0.026 0.028 0.03 0 50 100 150 200 250 S.S. R^2 for 100 relabels (sph)

4 5 6 x 10^{-4} 0

2000

4000

6000

S.S. R^2 for 100 relabels (ell)