-0.04 -0.02 0 0 10 20 30 40 50 60 Scal. Schizo, O.P. (raw)

Female, n = 14 Proj. ortho to Male

R^2 Dir. = 0.012777 R^2 S.S.. = 0.023838

-0.02 0 0.02 0 5 10 15 20 Scal. Schizo, O.P. (raw)

Male, n = 26 Proj. ortho to Female

R^2 Dir. = 0.042861 R^2 S.S.. = 0.11084

0 5 10 0 0.1 0.2 0.3 0.4 0.5 Scal. Schizo, O.P. (mad)

Female, n = 14 Proj. ortho to Male

R^2 Dir. = 0.081134 R^2 S.S.. = 0.24105

-5 0 5 0

0.05

0.1

Scal. Schizo, O.P. (mad)

Male, n = 26 Proj. ortho to Female

R^2 Dir. = 0.083573 R^2 S.S.. = 0.43263

-0.1 0 0.1 0.2 0 1 2 3 4 5

Scal. Schizo, O.P. (sph)

Female, n = 14 Proj. ortho to Male

R^2 Dir. = 0.0097164 R^2 S.S.. = 0.039098

-0.5 0 0.5 0 0.5

1

1.5

2 Scal. Schizo, O.P. (sph)

Male, n = 26 Proj. ortho to Female

R^2 Dir. = 0.061008 R^2 S.S.. = 0.14764

-5 0 5 x 10^{-4} 0 200 400 600 800 Scal. Schizo, O.P. (ell)

Female, n = 14 Proj. ortho to Male

R^2 Dir. = 0.00030278 R^2 S.S.. = 0.0009449

-4 -2 0 2 x 10^{-3} 0 50 100 150 200

Scal. Schizo, O.P. (ell)

Male, n = 26 Proj. ortho to Female

R^2 Dir. = 0.0088694 R^2 S.S.. = 0.014185

0.05 0.06 0.07 0 10 20 30 40 50 S.S. R^2 for 100 relabels (raw)

0.35 0.4 0.45 0 2 4 6 8 10 12 S.S. R^2 for 100 relabels (mad)

0.07 0.08 0.09 0.1 0.11 0 10 20 30 40 50 S.S. R^2 for 100 relabels (sph)

4 6 8 10 x 10^{-3} 0 50 100 150 200 250 300 S.S. R^2 for 100 relabels (ell)