50 100 150 200 250

0

2

4

6

8 Flow Cytometry, LNU, col. 10

channel sqrt(counts)

SiZer Map

channel log10(h)

50 100 150 200 250 0

0.5

1

1.5

2

2.5

SiCon Map

channel

50 100 150 200 250 0

0.5

1

1.5

2

2.5