0

20

40 Raw Data

0

20

40 Mean

-10 0 10 Mean Resid.

-10 0 10 PC1

-10 0 10 resid, PC1

0

20

40 Mean +- PC1

-10 0 10 PC2

-10 0 10 resid, PC2

0

20

40 Mean +- PC2