-4 -2 0 2 4 -4 -2 0 2 4 E. L1, prkpreo 97.9048% of MR

-4 -2 0 2 4 -4 -2 0 2 4 E. L1, prkpreo 0.72337% of MR

-4 -2 0 2 4 -4 -2 0 2 4 E. L1, prkpreo 0.57055% of MR

-4 -2 0 2 4 -4 -2 0 2 4 E. L1, prkpreo 0.31225% of MR

-4 -2 0 2 4 -4 -2 0 2 4 E. L1 + PC1

-4 -2 0 2 4 -4 -2 0 2 4 E. L1 - PC1

-4 -2 0 2 4 -4 -2 0 2 4 E. L1 + PC2

-4 -2 0 2 4 -4 -2 0 2 4 E. L1 - PC2

-4 -2 0 2 4 -4 -2 0 2 4 E. L1 + PC3

-4 -2 0 2 4 -4 -2 0 2 4 E. L1 - PC3

-4 -2 0 2 4 -4 -2 0 2 4 E. L1 + PC4

-4 -2 0 2 4 -4 -2 0 2 4 E. L1 - PC4

-0.05 0 0.05 0 5 10 15 20 Projections

-0.02 0 0.02 0

50

100 Projections

-0.01 0 0.01 0 50 100 150 200 Projections

-5 0 5 x 10^{-3} 0 50 100 150 200 Projections

Static PCA, using E. L1 and PCA, for file list: prkpreo, 14-Nov-1998 NMAX = 10 r0 = 4