-2.5 -2 -1.5 -1 -0.5 0

-3 -2 -1 0 1

log10(sigma) log10(Risk)

#5 Bumps

Haar Symm8 Fourier Raw Y

-2.5 -2 -1.5 -1 -0.5 0 -4 -3 -2 -1 0 1

log10(sigma)

#10 TSh Sine

Haar Symm8 Fourier Raw Y