Avg. Dir’n Angles, d = 10

MD DWD1 SVMPA

MD

DWD1

SVMPA

Avg. Dir’n Angles, d = 40

MD DWD1 SVMPA

MD

DWD1

SVMPA

Avg. Dir’n Angles, d = 100

MD DWD1 SVMPA

MD

DWD1

SVMPA

Avg. Dir’n Angles, d = 400

MD DWD1 SVMPA

MD

DWD1

SVMPA

Avg. Dir’n Angles, d = 1600

MD DWD1 SVMPA

MD

DWD1

SVMPA 20

40

60

80

0 0.5 1 0

0.2

0.4

0.6

0.8

1 mu +-2.2 & * 0.5