0 10 20 30 Figure 7a

Row-wise % Sig.

Conventional Row-Wise Glob. Indep. Glob. Bonf.

0 10 20 30 Figure 7b KDE FDR RDR

-2 -1.5 -1 -0.5 0 0 10 20 30 Figure 7c

log_{10}(h)